INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2608, '用煤量查询', 2597, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:coalconsumption:query', '', 'admin', '2026-01-20 10:04:29', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2607, '能源删除', 2590, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:coal:delete', '', 'admin', '2026-01-20 10:03:45', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2606, '能源编辑', 2590, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:coal:edit', '', 'admin', '2026-01-20 10:02:59', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2605, '能源新增', 2590, 0, '', '', NULL, 1, 0, 'F', '0', '0', 'energy:coal:create', '', 'admin', '2026-01-20 10:02:11', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2604, '能源查询', 2590, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:coal:query', '', 'admin', '2026-01-20 10:01:16', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2603, '用电量查询', 2596, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:electricityconsumption:query', '', 'admin', '2026-01-20 10:00:24', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2602, '用水量查询', 2589, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:waterconsumption:query', '', 'admin', '2026-01-20 09:58:38', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2601, '电表删除', 2589, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:electricity:delete', '', 'admin', '2026-01-20 09:57:44', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2600, '电表编辑', 2589, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:electricity:update', '', 'admin', '2026-01-20 09:56:53', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2599, '电表新增', 2589, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:electricity:create', '', 'admin', '2026-01-20 09:56:10', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2598, '电表查询', 2589, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:electricity:query', '', 'admin', '2026-01-20 09:55:23', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2597, '用煤量', 2587, 0, 'coalconsumption', 'energy/coal/consumption', NULL, 1, 0, 'C', '0', '0', NULL, 'ep:histogram', 'admin', '2026-01-19 17:51:42', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2596, '用电量', 2587, 0, 'electricityconsumption', 'energy/electricity/consumption', NULL, 1, 0, 'C', '0', '0', NULL, 'fa-solid:car-battery', 'admin', '2026-01-19 17:50:27', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2595, '用水量', 2587, 0, 'waterconsumption', 'energy/water/consumption', NULL, 1, 0, 'C', '0', '0', NULL, 'fa-solid:hand-holding-water', 'admin', '2026-01-19 17:48:22', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2594, '水表删除', 2588, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:water-monitoring:delete', '', 'admin', '2026-01-19 17:42:50', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2593, '水表编辑', 2588, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:water-monitoring:update', '', 'admin', '2026-01-19 17:42:06', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2592, '水表新增', 2588, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:water-monitoring:create', '', 'admin', '2026-01-19 17:40:47', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2591, '水表查询', 2588, 0, '', NULL, NULL, 1, 0, 'F', '0', '0', 'energy:water-monitoring:query', '', 'admin', '2026-01-19 17:39:05', '', NULL, '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2590, '能源监测', 2587, 0, 'coal', 'energy/coal/index', NULL, 1, 0, 'C', '0', '0', NULL, 'ep:document', 'admin', '2026-01-19 17:34:23', '', '2026-01-19 17:34:27', '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2589, '电表监测', 2587, 0, 'electric', 'energy/electricity/index', NULL, 1, 0, 'C', '0', '0', NULL, 'fa-solid:ellipsis-h', 'admin', '2026-01-19 17:31:10', '', '2026-01-19 17:31:14', '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2588, '水表监测', 2587, 0, 'water', 'energy/water/index', NULL, 1, 0, 'C', '0', '0', NULL, 'fa-solid:ellipsis-h', 'admin', '2026-01-19 17:29:09', '', '2026-01-19 17:29:13', '');
INSERT INTO `sys_menu` (`menu_id`, `menu_name`, `parent_id`, `order_num`, `path`, `component`, `query`, `is_frame`, `is_cache`, `menu_type`, `visible`, `status`, `perms`, `icon`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`) VALUES (2587, '能耗管理', 0, 0, '/energy', NULL, NULL, 1, 0, 'M', '0', '0', NULL, 'fa-solid:water', 'admin', '2026-01-19 17:22:38', '', '2026-01-19 17:22:43', '');
