-- 设备维修单明细表添加字段
ALTER TABLE `dm_repair_order_entry` ADD COLUMN `fault_phenomenon` varchar(500) DEFAULT NULL COMMENT '故障现象';
ALTER TABLE `dm_repair_order_entry` ADD COLUMN `expert_suggestion` varchar(500) DEFAULT NULL COMMENT '专家建议';
ALTER TABLE `dm_repair_order_entry` ADD COLUMN `spare_parts_usage` varchar(500) DEFAULT NULL COMMENT '备品备件使用';
ALTER TABLE `dm_repair_order_entry` ADD COLUMN `maintenance_conclusion` varchar(500) DEFAULT NULL COMMENT '维修结论';